en-us	Pages not found

en-us	Adds a tab to the Stats dashboard, showing the pages requested by your visitors that have not been found.

en-us	The "pages not found" cache has been emptied.

en-us	The "pages not found" cache has been deleted.

en-us	Guide

en-us	404 errors

en-us	A 404 error is an HTTP error code which means that the file requested by the user cannot be found. In your case it means that one of your visitors entered a wrong URL in the address bar, or that you or another website has a dead link. When possible, the referrer is shown so you can find the page/site which contains the dead link. If not, it generally means that it is a direct access, so someone may have bookmarked a link which doesn't exist anymore.

en-us	How to catch these errors?

en-us	If your webhost supports .htaccess files, you can create one in the root directory of PrestaShop and insert the following line inside: "%s".

en-us	A user requesting a page which doesn't exist will be redirected to the following page: %s. This module logs access to this page.

en-us	You must use a .htaccess file to redirect 404 errors to the "404.php" page.

en-us	Page

en-us	Referrer

en-us	Counter

en-us	No "page not found" issue registered for now.

en-us	Empty database

en-us	Empty ALL "pages not found" notices for this period

en-us	Empty ALL "pages not found" notices

en-us	Enrich your stats, display the pages requested by your visitors that could not be found.