en-us	RSS feed block

en-us	Adds a block displaying a RSS feed.

en-us	RSS feed

en-us	Invalid feed URL

en-us	Invalid title

en-us	Invalid number of feeds

en-us	You have selected a feed URL from your own website. Please choose another URL.

en-us	Feed is unreachable, check your URL

en-us	Invalid feed: %message%

en-us	Error: invalid RSS feed in "%module_name%" module: %message%

en-us	Block title

en-us	Create a title for the block (default: 'RSS feed').

en-us	Add a feed URL

en-us	Add the URL of the feed you want to use (sample: http://news.google.com/?output=rss).

en-us	Number of threads displayed

en-us	Number of threads displayed in the block (default value: 5).