en	Your page will be saved as a draft

en	You can choose to keep your images stored in the previous system. There's nothing wrong with that.

en	You can also decide to move your images to the new storage system. In this case, click on the "Move images" button below. Please be patient. This can take several minutes.

en	After moving all of your product images, set the "Use the legacy image filesystem" option above to "No" for best performance.

en	Be careful! Depending on the options selected, former manually uploaded thumbnails might be erased and replaced by automatically generated thumbnails.

en	Also, regenerating thumbnails for all existing images can take several minutes, please be patient.

en	If you want to order/move the following data, please select a shop from the shop list.

en	Current theme is unavailable. Please check your theme's directory name ("%s") and permissions.

en	No items found

en	Duplicate images were found when moving the product images. This is likely caused by unused demonstration images. Please make sure that the folder %folder% only contains demonstration images, and then delete it.

en	Incorrect value for the selected JPEG image compression.

en	Incorrect value for the selected PNG image compression.

en	Source file does not exist or is empty (%filepath%)

en	Failed to resize image file (%filepath%)

en	Failed to resize image file to high resolution (%filepath%)

en	Original image is corrupt (%filename%) for product ID %id% or bad permission on folder.

en	Original image is missing or empty (%filename%) for product ID %id%

en	Cannot write images for this type: %1$s. Please check the %2$s folder's writing permissions.

en	Only part of the images have been regenerated. The server timed out before finishing.

en	Server timed out. The watermark may not have been applied to all images.

en	Cannot write "No picture" image to %s images folder. Please check the folder's writing permissions.

en	Error: Your server configuration is not compatible with the new image system. No images were moved.

en	Not all images have been moved. The server timed out before finishing. Click on "Move images" again to resume the moving process.

en	Error: Some -- or all -- images cannot be moved.

en	After modification, do not forget to regenerate thumbnails

en	Not all images have been moved. The server timed out before finishing. Click on "%move_images_label%" again to resume the moving process.

en	The uploaded file is too large.

en	Failed to move uploaded file.

en	This theme is not valid for PrestaShop 1.7

en	An error occurred. The information "%s" is missing.

en	An error occurred. The template "%s" is missing.

en	An error occurred while uploading the favicon: cannot copy file "%s" to folder "%s".

en	Your theme has been correctly exported: %path%

en	The page Category cannot be moved here.

en	Your RTL stylesheets has been generated successfully

en	Your theme has been correctly reset to its default settings. You may want to regenerate your images. See the Improve > Design > Images Settings screen for the 'Regenerate thumbnails' button.

en	There is already a theme %theme_name% in your themes folder. Remove it if you want to continue.

en	Failed to delete theme. Make sure you have permissions and theme is not used.

en	Cannot adapt theme to RTL languages.

en	Your theme has been correctly reset to its default settings. You may want to regenerate your images. See the Improve > Design > Images Settings screen for the '%regenerate_label%' button.

en	This name already exists.

en	Invalid file format.

en	Warning: if no email logo is available, the main logo will be used instead.